


               You can select the type of output you would like to see
          in  xmagic's  display window or on a file by clicking on one
          of the options in boxes labelled  "tty  output:"  and  "file
          output:".  Output formats can be set to

          none        No matrices  are  printed,  although  the  final
                      statistics are still sent to the display window.
                      This is the default for both tty and  file  out-
                      put.

          pretty      Matrices are  printed  in  human-readable  form.
                      Each  matrix  is  followed  by  an assignment of
                      values falsifying the "bad guy" if there is one.

          ugly        Matrices are printed in a standard machine read-
                      able  form  with -1 as break character. No head-
                      ings, comments, etc., are included.

          summary     Only the numbers of matrices are  printed.  This
                      is  useful for checking the size of a job before
                      getting a printout of matrices. It  runs  faster
                      than "pretty" or "ugly"

               If  either  "pretty",  or  "ugly",  or  "summary"   are
          selected  for  the  "file  output:"  the "file name:" dialog
          becomes active. You can enter new file name  in  the  dialog
          window  and  inform  MaGIC  about the change of file name by
          clicking on the "change" button. MaGIC will not take  notice
          of  the  change until it is asked to do so! If you run MaGIC
          on a remote host, the file will be created on that host.
